CAL+TKS R-Z VIEW 17-APR-1998 14:15 Run   75862 Event    8656     12-MAR-1994 23:20

MUON ELEC TAUS VEES OTHER

0.5 <E< 1.5

1.5 <E< 2.5

2.5 <E< 3.5

3.5 <E< 4.5

4.5 <E

 Max ET=   49.1 GeV
 CAEH ET SUM= 143.6 GeV
 VTX in Z= -35.4 (cm)