 LEGO CAL CAEP   17-APR-1998 13:31 Run   73415 Event   11907     12-JAN-1994 11:50

ENERGY CAEP ETA-PHI

EM E HAD E

 CALEGO EMIN = 0.5 GeV
 CAEP E SUM = 549.3 GeV