CAL+TKS R-Z VIEW 17-APR-1998 13:31 Run   73415 Event   11907     12-JAN-1994 11:50

MUON ELEC TAUS VEES OTHER

0.5 <E< 1.5

1.5 <E< 2.5

2.5 <E< 3.5

3.5 <E< 4.5

4.5 <E

 Max ET=   29.2 GeV
 CAEH ET SUM=  94.9 GeV
 VTX in Z=  45.0 (cm)