(helicity) P -0.2 0 0.2 0.4

(beam) P

-0.2

0

0.2

0.4^{Measurement}

Standard Model Z’ Axigluon models m200R m200L m2000A m2000R 68 % CL region 95 % CL region 99.7 % CL region

-1 DØ, 9.7 fb