(beam) generated P -0.2 -0.1 0 0.1 0.2

(beam) measured P

-0.2

-0.1

0

0.1

0.2

Axigluon models m200R m200L m2000A m2000R

SM (MC@NLO+Herwig) SM (ALPGEN+PYTHIA) Z’

DØ Simulation