)t M(t

Entries/30 GeV

0 100 200 300 400 Data tt Other bgs W+hf W+lf Multijet

(b)

0

400 -1 DØ 9.7 fb

l+jets

0

[GeV] ttm 200 400 600 800 1000

Ratio

0.5 1 1.5 2 1 2