W’ mass [GeV]

600 650 700 750 800

) [pb] b t→ B(W’ × Cross section

0 0.5 1 1.5 2 2.5 3 3.5 observed limit expected limit L SM+W’

×

0

1

2

3

(a)

-1 DØ 230 pb