(GeV) γ Tp 0 50 100 150 200 250

Data / Theory

0.4

0.6

0.8

1

1.2

1.4

γ

1

ratio of data to theory (JETPHOX) CTEQ6.1M PDF uncertainty scale dependence )^γ_T and 2p γ T =0.5p fμ=_Fμ=_Rμ(

DØ

300

-1 L = 326 pb