(GeV) γ Tp 0 50 100 150 200 250 300

(pb/GeV) η/d_T

/ dp σ^2d

-3 10

-2 10

-1 10 1 10 210 310 data NLO QCD )^γ_T=p_fμ=_Fμ=_Rμ( CTEQ6.1M

-1 L = 380 pb

DØ