(GeV) γ Tp 0 50 100 150 200 250 300

Photon purity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

Extracted purity Fit Stat. uncertainty Total uncertainty

DØ_{-1}

L = 380 pb

γ 0

1