(GeV) LQ M 150 200 250 300 350 400

(pb) 2B×σ

-2 10

-1 10

1

10 -1 D0, L = 425 pb LQ = 1M μ Scalar LQ cross-section, NLO, ], B=1

)σ(^2_{PDF} δ ) + σ(^2_μδ±σ [× ^2B )_{sp}

], B=(1 - 0.5*F

)σ(^2_{PDF} δ ) + σ(^2_μδ - σ [× ^2B

Observed limit

M

1