M(q*) [GeV]

300 350 400 450 500 550 600 650 700

[pb] q*σ , 95σ

-210

-110

1 1 =1 ) ξ ( q*σ =1 ) ξ ( 95σ =0.7 ) ξ ( 95σ =0.5 ) ξ ( 95σ =0.3 ) ξ ( 95σ

-1 DØ, 370 pb