[GeV] Zj1 M 0 100 200 300 400 500 600 700 800 900 1000

Events/Bin

-310

-210

-110

1 10 210 310 410_{-1} DØ, 370 pb

Data

= 500 GeV q*M 1 → PYTHIA 2 > 100 GeV ZqM > 200 GeV ZqM > 300 GeV ZqM > 400 GeV ZqM