[GeV] 0m 0 50 100 150 200 250 300 350 400 450 500

[GeV] 1/2 m

0

100

200

300

400

500

600

=100 GeV 1 0 χ ∼

=75 GeV 1 0 χ ∼

=200 GeV l ~ =300 GeV l ~

=200 GeV rq ~ =400 GeV rq ~

=600 GeV rq ~

=800 GeV rq ~

LEP limit Not allowed is the τ∼ LSP -1 , 0.38 fb OD

<0 μ )=5, β tan(

0.02 0.04 0.06 0.08 0.1 0.12 0.14 0.16 0.18 0.2

211’λ

95% CL Exclusion Contour for _{211}’λ

95% CL Exclusion Contour for