Exclusion domains 121λ obs.

122λ obs.

133λ obs.

121λ exp.

122λ exp.

133λ exp.

LEP excluded

1χ∼^± is LSP

0

±

[GeV] 1χ∼M 20 60 100 140 180 220

[GeV] 1χ∼M

100

140

180

220

260 DØ, 360 pb^{-1}