150 200 250 300 (SUSY) NLO σ expected limits observed

121λ

observed

122λ

observed

133λ

60 80 100 120 140 160

[pb]

95%CL σ, NLO σ

-1 10

1 DØ, 360 pb^{-1}

=1 TeV 0m >0μ =0, 0 =5, A β tan -2 10×2

2 [GeV] 1χ∼M ^±

[GeV]

1χ∼M ^0