[GeV] *μm 200 250 300 350 400 450 500 550 600

[TeV] Λ

1.0

1.5

2.0

2.5

3.0

3.5

4.0 -1

380 pb OD

at 95% CL excluded

γμ→^*μ μ^*μ→pp

Λ

4.0