[GeV] *μm 0 200 400 600 800 1000

)γμ→ ^*μ [pb] * B( σ

-510

-410

-310

-210

-110

1

10 -1 380 pb OD

LEP Exclusion Region 190 GeV

=1 TeV Λ =2 TeV Λ =4 TeV Λ Limit (95% CL)

> 618 GeV *μm

σ

1