0 200 400 600 800 1000 1200 1400 0 0.2 0.4 0.6 0.8 1 1.2 1.4

μTp 0 50 100 150 200 250 300

Events / 5 GeV

[GeV] 0 2 4 6 8 10 12 14 16 18^{-1}

380 pb OD Data μμ→ ^*γ/Z misid. γ Signal

μTp [GeV] 0 2 4 6 8

18