(GeV) Tp 50 100 150 200 250 300

Events / 8 GeV

-110 1 10 210 310 410 a)

dη -2 -1 0 1 2

Events / 0.2

0 500 1000

1500

2000

2500 b)

Data SM Background

-1 DØ Run II, 246 pb

(radians) ϕ 0 1 2 3 4 5 6

Events / 0.21 radians

600 800 1000

1200

1400

1600

1800 c)