(GeV) HM 100 120 140 160 180 200

WW) (pb) → (WH) x Br(H σ

-2 10

-1 10

1

10

Excluded by LEP

Observed 95% C.L. limit Fermiophobic Higgs Standard Model Higgs

-1 DØ, 360-380 pb