[GeV] AM 80 100 120 140 160 180 200

β tan

0 10 20 30 40 50 60 70 80 90

β

0

<0μ DØ >0μ DØ <0μττ DØ >0μττ DØ <0μττ CDF >0μττ CDF

no-mixing

>0) μ LEP 2 ( <0) μ LEP 2 (

-1 DØ 260-325 pb_{-1} CDF 310 pb