[GeV] ΦM 100 150 200 250 300

) [pb] ττ→Φ BR( ×)Φ→p(pσ

1

10

210 observed limit expected limit band σ 1± band σ 2± CDF obs. limit CDF exp. limit

-1 DØ 325 pb

1