0 2 4 6 8 10 12 14 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Fraction of Events

(b) -1 D0, 4.35 fb Data - Background Pythia8+Tune2C Pythia8+Tune2M Pythia8+CMS UETune Total Uncertainty

0 2 4 6 8 10 12 14

( GeV ) T Reco-level u

0.95 1 1.05

Theory

Data-BKG