50 60 70 80 90 100 110 120

10

20

30

40

50 310 ×

Number of Events / 0.5 GeV

(c) -1 D0, 4.35 fb /ndf=154.0/140 2χ Data Signal Background

50 60 70 80 90 100 110 120

( GeV ) Tm 0.9 1 1.1

Pred.

Data