3.9 4 4.1 4.2 4.3 4.4

) [GeV] ±πψ M(J/ 0 200 400 600 800 1000

1200

Events/ 20 MeV

-1 D0 Run II, 10.4 fb

(f)

)<4.7 GeV -π^+πψ 4.6<M(J/

Primary Total fit Signal Background