]^{-1} [ps smΔ 0 5 10 15 20 25

Amplitude

-4 -2 0 2 4_{(stat.)σ 1.645±data}

syst.) ⊕ (stat. σ 1.645 ± data σ 1 ± data

-1 95% CL limit: 14.8ps -1 Expected limit: 14.1ps

DØ Run II

-1 1 fb