2 GeV/c

0.42 0.44 0.46 0.48 0.5 0.52 0.54 0.56

Events/3 MeV

0

2000

4000

6000

8000

10000 1 x10 Invariant Mass S 0K / ndf

2χ 267.2 / 44 Nevts 1909±

5.783e+05 μ 1.837e-05 ± 0.4934 1σ 4.362e-05 ± 0.006881 1_σf 0.006725 ± 0.6066 2σ 0.0002808 ± 0.01779 a0 232.7±

1.901e+04 a1 468.8±

5282

1909 ± N = 578,338