2 GeV/c

2.6 2.8 3 3.2 3.4 3.6

Events/22 MeV

0

10000

20000

30000

40000

50000

Invariant Mass ψJ/

/ ndf

2χ 306 / 43 Nevts 930.6±

3.831e+05 Mean 0.0001604 ± 3.074 1σ 0.0006502 ± 0.05687 2_{σ/1σ}f 0.01677 ± 0.5202 2σ 0.001514 ± 0.107 a0 112.5±

1.345e+04 a1 35.89±

-2383 926 ± N = 383,087