)^2

Invariant Mass (GeV/c

5 5.1 5.2 5.3 5.4 5.5 5.6

2 Candidates per 18 MeV/c

0 200 400 600 800 1000

1200

1400

2

0

Data Signal Background Total

* K ψ J/

→ _dB 54 ± Events = 1370 DØ